<script lang="ts">
    import Sqmenu from "$lib/sqmenu.svelte";
    import type { MenuData } from "$lib/classes/menudata"
    let menudata: MenuData[] = [{menuLink: '/abtme', menuName:'Sobre mi'}, {menuLink: '/temps', menuName:'Temps'}, {menuLink: '/xema', menuName:'Dades XEMA'}, {menuLink: '/openmeteo', menuName:'Dades Open Meteo'}]
    // let menudata: MenuData[] = []
</script>

<div class="p-8">
<Sqmenu {menudata} />
</div>